    Password

    This window allows you to change a currently defined User Account
    password. 

    Fields

    Username 

    This field specifies the username whose password is being changed.

    New Password

    Enter the new passwoed in this field. Please note that you will
    not be asked to re-type the password for verification. Make sure
    you have typed what you mean to type the first time.

    Hostname
  
    This read only field specifies on which host the user's password
    is being changed.

    Buttons

    Apply

    If you have selected multiple usernames, clicking on the Apply
    button will set the current password and bring up the next user.

    Next

    Clicking on the Next button causes Enlighten to skip to the next
    selected user without changing the user's password.

    Close

    Click on the Close button to discontinue changing passwords. Any
    previous changes made by using the Apply button remain; they are not
    undone by clicking this button.
